\label{doc_usecases_integration_UC_end_user_md_md_doc_usecases_integration_UC_end_user}%
\Hypertarget{doc_usecases_integration_UC_end_user_md_md_doc_usecases_integration_UC_end_user}%
 \hypertarget{doc_usecases_integration_UC_end_user_md_autotoc_md4800}{}\doxysection{Summary}\label{doc_usecases_integration_UC_end_user_md_autotoc_md4800}

\begin{DoxyItemize}
\item {\bfseries{Scope\+:}} End User Configuration
\item {\bfseries{Level\+:}} Kite
\item {\bfseries{Actors\+:}} End User, System Administrator
\item {\bfseries{Brief\+:}} End user customizes application settings using the configuration interface provided by Libelektra, enabling them to tailor the application to their preferences.
\item {\bfseries{Status\+:}} Draft
\end{DoxyItemize}\hypertarget{doc_usecases_integration_UC_end_user_md_autotoc_md4801}{}\doxysection{Scenarios}\label{doc_usecases_integration_UC_end_user_md_autotoc_md4801}

\begin{DoxyItemize}
\item {\bfseries{Precondition\+:}} Application has been developed with Libelektra integrated for configuration management and provides a user-\/friendly interface for end users to modify settings.
\item {\bfseries{Main success scenario\+:}} End user successfully modifies application settings using the provided interface, leading to an improved user experience tailored to their preferences.
\item {\bfseries{Alternative scenario\+:}} End user encounters issues while trying to modify settings, requiring them to seek assistance from support or refer to help documentation.
\item {\bfseries{Error scenario\+:}} End user\textquotesingle{}s modifications lead to unintended behavior or conflicts in the application, requiring either the end user or system administrator to resolve the issue.
\item {\bfseries{Postcondition\+:}} Application settings have been modified by the end user, resulting in a customized user experience.
\item {\bfseries{Non-\/functional Constraints\+:}}
\begin{DoxyItemize}
\item Usability\+: The configuration interface should be user-\/friendly and easy to navigate for end users.
\item Flexibility\+: Libelektra should support a wide range of configuration options and settings to cater to various end user preferences.
\item Robustness\+: The configuration system should be robust and capable of handling potential conflicts or errors caused by end user modifications. 
\end{DoxyItemize}
\end{DoxyItemize}