\label{err__err000001}
\hypertarget{err__err000001}{}
 
\begin{DoxyDescription}
\item[Global \hyperlink{group__plugin_gae65781a1deb34efc79c8cb9d9174842c}{elektraDocSet}(Plugin $\ast$handle, KeySet $\ast$returned, Key $\ast$parentKey) ]In normal execution cases a positive value will be returned. But in some cases you are not able to set keys and have to return -\/1. If you declare kdbcGetnoError() you are done, but otherwise you have to set the cause of the error. (Will be added with 0.7.1)
\end{DoxyDescription}