\label{todo__todo000002}
\hypertarget{todo__todo000002}{}
 
\begin{DoxyDescription}
\item[Global \hyperlink{group__plugin_gacb69f3441c6d84241b4362f958fbe313}{elektraDocGet}(Plugin $\ast$handle, KeySet $\ast$returned, Key $\ast$parentKey) ]needs some updates
\end{DoxyDescription}

\label{todo__todo000001}
\hypertarget{todo__todo000001}{}
 
\begin{DoxyDescription}
\item[Global \hyperlink{group__keytest_ga6a994eebd4b1c253d4912fa80df16506}{keyClearSync}(Key $\ast$key) ]Should be done only in \hyperlink{group__kdb_ga28e385fd9cb7ccfe0b2f1ed2f62453a1}{kdbGet()} part of plugins.
\end{DoxyDescription}