\hypertarget{testtool__umount_8cpp}{\section{testtool\-\_\-umount.\-cpp File Reference}
\label{testtool__umount_8cpp}\index{testtool\-\_\-umount.\-cpp@{testtool\-\_\-umount.\-cpp}}
}


Tests for the umount.  


{\ttfamily \#include $<$backends.\-hpp$>$}\\*
{\ttfamily \#include $<$backend.\-hpp$>$}\\*
{\ttfamily \#include $<$keysetio.\-hpp$>$}\\*
{\ttfamily \#include $<$gtest/gtest.\-h$>$}\\*
Include dependency graph for testtool\-\_\-umount.\-cpp\-:
\nopagebreak
\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=350pt]{testtool__umount_8cpp__incl}
\end{center}
\end{figure}
\subsection*{Functions}
\begin{DoxyCompactItemize}
\item 
void \hyperlink{testtool__umount_8cpp_a04eff5c96f814ac13e5769f9cd009d91}{test\-Old\-Mount} (std\-::string mp, std\-::string ump)
\begin{DoxyCompactList}\small\item\em Test umount with compatibility umount-\/names. \end{DoxyCompactList}\end{DoxyCompactItemize}


\subsection{Detailed Description}
Tests for the umount. \begin{DoxyCopyright}{Copyright}
B\-S\-D License (see doc/\-C\-O\-P\-Y\-I\-N\-G or \href{http://www.libelektra.org}{\tt http\-://www.\-libelektra.\-org}) 
\end{DoxyCopyright}


\subsection{Function Documentation}
\hypertarget{testtool__umount_8cpp_a04eff5c96f814ac13e5769f9cd009d91}{\index{testtool\-\_\-umount.\-cpp@{testtool\-\_\-umount.\-cpp}!test\-Old\-Mount@{test\-Old\-Mount}}
\index{test\-Old\-Mount@{test\-Old\-Mount}!testtool_umount.cpp@{testtool\-\_\-umount.\-cpp}}
\subsubsection[{test\-Old\-Mount}]{\setlength{\rightskip}{0pt plus 5cm}void test\-Old\-Mount (
\begin{DoxyParamCaption}
\item[{std\-::string}]{mp, }
\item[{std\-::string}]{ump}
\end{DoxyParamCaption}
)}}\label{testtool__umount_8cpp_a04eff5c96f814ac13e5769f9cd009d91}


Test umount with compatibility umount-\/names. 


\begin{DoxyParams}{Parameters}
{\em mp} & the mountpoint to mount \\
\hline
{\em ump} & the mountpoint to umount \\
\hline
\end{DoxyParams}
