{\ttfamily kdb list-\/tools}

\subsection*{D\+E\+S\+C\+R\+I\+P\+T\+I\+O\+N}

This command lists all the externel tools that are available to Elektra. By default, external tools are located in the {\ttfamily /usr/local/lib/elektra/tool\+\_\+exec} directory.

The tool itself is extern. 