\hypertarget{testtool__umount_8cpp}{\section{testtool\+\_\+umount.\+cpp File Reference}
\label{testtool__umount_8cpp}\index{testtool\+\_\+umount.\+cpp@{testtool\+\_\+umount.\+cpp}}
}


Tests for the umount.  


{\ttfamily \#include $<$backends.\+hpp$>$}\\*
{\ttfamily \#include $<$backend.\+hpp$>$}\\*
{\ttfamily \#include $<$keysetio.\+hpp$>$}\\*
{\ttfamily \#include $<$gtest/gtest.\+h$>$}\\*
Include dependency graph for testtool\+\_\+umount.\+cpp\+:
\nopagebreak
\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=350pt]{testtool__umount_8cpp__incl}
\end{center}
\end{figure}
\subsection*{Functions}
\begin{DoxyCompactItemize}
\item 
void \hyperlink{testtool__umount_8cpp_a04eff5c96f814ac13e5769f9cd009d91}{test\+Old\+Mount} (std\+::string mp, std\+::string ump)
\begin{DoxyCompactList}\small\item\em Test umount with compatibility umount-\/names. \end{DoxyCompactList}\end{DoxyCompactItemize}


\subsection{Detailed Description}
Tests for the umount. 

\begin{DoxyCopyright}{Copyright}
B\+S\+D License (see doc/\+C\+O\+P\+Y\+I\+N\+G or \href{http://www.libelektra.org}{\tt http\+://www.\+libelektra.\+org}) 
\end{DoxyCopyright}


\subsection{Function Documentation}
\hypertarget{testtool__umount_8cpp_a04eff5c96f814ac13e5769f9cd009d91}{\index{testtool\+\_\+umount.\+cpp@{testtool\+\_\+umount.\+cpp}!test\+Old\+Mount@{test\+Old\+Mount}}
\index{test\+Old\+Mount@{test\+Old\+Mount}!testtool\+\_\+umount.\+cpp@{testtool\+\_\+umount.\+cpp}}
\subsubsection[{test\+Old\+Mount}]{\setlength{\rightskip}{0pt plus 5cm}void test\+Old\+Mount (
\begin{DoxyParamCaption}
\item[{std\+::string}]{mp, }
\item[{std\+::string}]{ump}
\end{DoxyParamCaption}
)}}\label{testtool__umount_8cpp_a04eff5c96f814ac13e5769f9cd009d91}


Test umount with compatibility umount-\/names. 


\begin{DoxyParams}{Parameters}
{\em mp} & the mountpoint to mount \\
\hline
{\em ump} & the mountpoint to umount \\
\hline
\end{DoxyParams}
