Information about currently loaded modules.

\subsection*{system/elektra/mountpoints}

The mountpoints present in the system.

\subsection*{system/elektra/version}

Version information.

\subsection*{spec/elektra/metadata}

{\ttfamily doc/\+M\+E\+T\+A\+D\+A\+T\+A.\+ini} needs to be mounted there

Avoids a duplication of documentation efforts of the meta data across plugins.

Currently it is documentation only, this might change if dependencies or similar between metadata is supported.

\subsection*{spec/elektra/modules}

{\ttfamily doc/\+C\+O\+N\+T\+R\+A\+C\+T.\+ini} needs to be mounted there

\subsection*{spec/elektra/error}

{\ttfamily src/error/specification} needs to be mounted there

\subsection*{S\+E\+E A\+L\+S\+O}


\begin{DoxyItemize}
\item \hyperlink{doc_tutorials_namespaces_md}{see namespaces tutorial}
\item \hyperlink{md_doc_help_elektra-namespaces_doc_help_elektra-namespaces_md}{elektra-\/namespaces(7)} 
\end{DoxyItemize}