
\begin{DoxyItemize}
\item infos = Information about the python plugin is in keys below
\item infos/author = Manuel Mausz \href{mailto:manuel-elektra@mausz.at}{\tt manuel-\/elektra@mausz.\+at}
\item infos/licence = B\+S\+D
\item infos/provides =
\item infos/needs =
\item infos/placements =
\item infos/status = maintained unittest memleak nodoc
\item infos/description = magic things require magic plugins
\end{DoxyItemize}

The plugin uses Python to do magic things.

\begin{DoxyVerb}kdb mount file.ini /python python script=/path/to/python/python_configparser.py,print=
\end{DoxyVerb}


\subsection*{Plugin Config}

Optional configuration values/flags\+:


\begin{DoxyItemize}
\item print (flag)\+: Make the plugin print engine errors, triggered by the calls of this plugin, to stderr. Mainly intended for diagnostic. Please note that the Python engine itself will print script errors to stderr regardless of this flag.
\item shutdown (value, 0 or 1)\+: If enabled, the last call to {\ttfamily \hyperlink{group__kdb_gadb54dc9fda17ee07deb9444df745c96f}{kdb\+Close()}} will also shutdown Pythons engine. Default is 0. 
\end{DoxyItemize}