\hypertarget{group__internaldatastructs}{\section{Internal Datastructures}
\label{group__internaldatastructs}\index{Internal Datastructures@{Internal Datastructures}}
}


Internal used Datastructures.  


Collaboration diagram for Internal Datastructures\+:
\nopagebreak
\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=288pt]{group__internaldatastructs}
\end{center}
\end{figure}
\subsection*{Modules}
\begin{DoxyCompactItemize}
\item 
\hyperlink{group__trie}{Trie}
\begin{DoxyCompactList}\small\item\em The private trie structure. \end{DoxyCompactList}\item 
\hyperlink{group__vheap}{Vheap}
\begin{DoxyCompactList}\small\item\em The Vheap structure. \end{DoxyCompactList}\item 
\hyperlink{group__vstack}{Vstack}
\begin{DoxyCompactList}\small\item\em The requirements are described in doc/help/elektra-\/data-\/structures.\+md. \end{DoxyCompactList}\end{DoxyCompactItemize}


\subsection{Detailed Description}
Internal used Datastructures. 

