\hypertarget{log_8c}{\section{log.\+c File Reference}
\label{log_8c}\index{log.\+c@{log.\+c}}
}


Non-\/\+C99 Logger Implementation.  


{\ttfamily \#include $<$stdio.\+h$>$}\\*
{\ttfamily \#include $<$kdblogger.\+h$>$}\\*
{\ttfamily \#include $<$syslog.\+h$>$}\\*
{\ttfamily \#include $<$kdbhelper.\+h$>$}\\*
{\ttfamily \#include $<$stdarg.\+h$>$}\\*
{\ttfamily \#include $<$stdlib.\+h$>$}\\*
{\ttfamily \#include $<$string.\+h$>$}\\*
Include dependency graph for log.\+c\+:
\nopagebreak
\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=350pt]{log_8c__incl}
\end{center}
\end{figure}


\subsection{Detailed Description}
Non-\/\+C99 Logger Implementation. 

If you often change the file, you might want to set C\+M\+A\+K\+E\+\_\+\+L\+I\+N\+K\+\_\+\+D\+E\+P\+E\+N\+D\+S\+\_\+\+N\+O\+\_\+\+S\+H\+A\+R\+E\+D to avoid relinking everything.

\begin{DoxyCopyright}{Copyright}
B\+S\+D License (see doc/\+L\+I\+C\+E\+N\+S\+E.\+md or \href{http://www.libelektra.org}{\tt http\+://www.\+libelektra.\+org}) 
\end{DoxyCopyright}
