\hypertarget{nolog_8c}{\section{nolog.\+c File Reference}
\label{nolog_8c}\index{nolog.\+c@{nolog.\+c}}
}


C99-\/compatible Fake Logger Implementation.  


{\ttfamily \#include $<$kdblogger.\+h$>$}\\*
{\ttfamily \#include $<$stdarg.\+h$>$}\\*
{\ttfamily \#include $<$stdio.\+h$>$}\\*
{\ttfamily \#include $<$stdlib.\+h$>$}\\*
Include dependency graph for nolog.\+c\+:
\nopagebreak
\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=350pt]{nolog_8c__incl}
\end{center}
\end{figure}


\subsection{Detailed Description}
C99-\/compatible Fake Logger Implementation. 

\begin{DoxyCopyright}{Copyright}
B\+S\+D License (see doc/\+L\+I\+C\+E\+N\+S\+E.\+md or \href{http://www.libelektra.org}{\tt http\+://www.\+libelektra.\+org}) 
\end{DoxyCopyright}
