\hypertarget{kdbioplugin_8h}{}\section{kdbioplugin.\+h File Reference}
\label{kdbioplugin_8h}\index{kdbioplugin.\+h@{kdbioplugin.\+h}}


Elektra-\/\+I/O functions and declarations for the I/O binding test suite.  


{\ttfamily \#include \char`\"{}kdbio.\+h\char`\"{}}\newline
{\ttfamily \#include \char`\"{}kdbplugin.\+h\char`\"{}}\newline
Include dependency graph for kdbioplugin.\+h\+:
\nopagebreak
\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=350pt]{kdbioplugin_8h__incl}
\end{center}
\end{figure}
This graph shows which files directly or indirectly include this file\+:
\nopagebreak
\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=157pt]{kdbioplugin_8h__dep__incl}
\end{center}
\end{figure}
\subsection*{Typedefs}
\begin{DoxyCompactItemize}
\item 
typedef void($\ast$ \hyperlink{kdbioplugin_8h_af6fffb17f949977fc528d8a03e33a84a}{Elektra\+Io\+Plugin\+Set\+Binding}) (Plugin $\ast$plugin, Key\+Set $\ast$parameters)
\begin{DoxyCompactList}\small\item\em Set I/O binding for asynchronous I/O operations for plugin. \end{DoxyCompactList}\end{DoxyCompactItemize}


\subsection{Detailed Description}
Elektra-\/\+I/O functions and declarations for the I/O binding test suite. 

\begin{DoxyCopyright}{Copyright}
B\+SD License (see L\+I\+C\+E\+N\+S\+E.\+md or \href{https://www.libelektra.org}{\tt https\+://www.\+libelektra.\+org}) 
\end{DoxyCopyright}


\subsection{Typedef Documentation}
\mbox{\Hypertarget{kdbioplugin_8h_af6fffb17f949977fc528d8a03e33a84a}\label{kdbioplugin_8h_af6fffb17f949977fc528d8a03e33a84a}} 
\index{kdbioplugin.\+h@{kdbioplugin.\+h}!Elektra\+Io\+Plugin\+Set\+Binding@{Elektra\+Io\+Plugin\+Set\+Binding}}
\index{Elektra\+Io\+Plugin\+Set\+Binding@{Elektra\+Io\+Plugin\+Set\+Binding}!kdbioplugin.\+h@{kdbioplugin.\+h}}
\subsubsection{\texorpdfstring{Elektra\+Io\+Plugin\+Set\+Binding}{ElektraIoPluginSetBinding}}
{\footnotesize\ttfamily typedef void($\ast$ Elektra\+Io\+Plugin\+Set\+Binding) (Plugin $\ast$plugin, Key\+Set $\ast$parameters)}



Set I/O binding for asynchronous I/O operations for plugin. 

Implemented by plugins to set the I/O binding.


\begin{DoxyParams}{Parameters}
{\em plugin} & plugin handle \\
\hline
{\em parameters} & contains the binary key \char`\"{}/io\+Binding\char`\"{} with a pointer to Elektra\+Io\+Interface \\
\hline
\end{DoxyParams}
