\hypertarget{doc_8c}{}\section{doc.\+c File Reference}
\label{doc_8c}\index{doc.\+c@{doc.\+c}}


Loading Modules for Elektra documentation.  


\subsection*{Functions}
\begin{DoxyCompactItemize}
\item 
int \hyperlink{group__modules_gaa40915e67f973ccd5258aa450bd03585}{elektra\+Modules\+Init} (Key\+Set $\ast$modules, Key $\ast$error)
\begin{DoxyCompactList}\small\item\em Initialises the module loading system. \end{DoxyCompactList}\item 
elektra\+Plugin\+Factory \hyperlink{group__modules_ga09300fbf0e0cfc9dc80bb877b00117c0}{elektra\+Modules\+Load} (Key\+Set $\ast$modules, const char $\ast$name, Key $\ast$error)
\begin{DoxyCompactList}\small\item\em Load a library with the given name. \end{DoxyCompactList}\item 
int \hyperlink{group__modules_ga5646d92ffe3e1e04c4586d9c910ba6bd}{elektra\+Modules\+Close} (Key\+Set $\ast$modules, Key $\ast$error)
\begin{DoxyCompactList}\small\item\em Close all modules. \end{DoxyCompactList}\end{DoxyCompactItemize}


\subsection{Detailed Description}
Loading Modules for Elektra documentation. 

\begin{DoxyCopyright}{Copyright}
B\+SD License (see doc/\+C\+O\+P\+Y\+I\+NG or \href{https://www.libelektra.org}{\tt https\+://www.\+libelektra.\+org}) 
\end{DoxyCopyright}
