Plugin readme is in \mbox{\hyperlink{autotoc_md538_src_plugins_python_README_md}{python}}. This file will not be used in the build process.

It is recommended to use \mbox{\hyperlink{autotoc_md538_src_plugins_python_README_md}{python}}. 