{\ttfamily kdb global-\/umount $<$name$>$}

Unmount a global plugin from the key database.


\begin{DoxyItemize}
\item {\ttfamily -\/H}, {\ttfamily -\/-\/help}\+: Show the man page.
\item {\ttfamily -\/V}, {\ttfamily -\/-\/version}\+: Print version info.
\item {\ttfamily -\/p}, {\ttfamily -\/-\/profile $<$profile$>$}\+: Use a different kdb profile.
\item {\ttfamily -\/C}, {\ttfamily -\/-\/color $<$when$>$}\+: Print never/auto(default)/always colored output.
\end{DoxyItemize}


\begin{DoxyCode}{0}
\DoxyCodeLine{\# Backup-and-Restore: system/elektra/globalplugins}
\DoxyCodeLine{}
\DoxyCodeLine{sudo kdb global-mount tracer}
\DoxyCodeLine{}
\DoxyCodeLine{sudo kdb global-mount}
\DoxyCodeLine{\# STDOUT-REGEX: .*spec⏎tracer.*}
\DoxyCodeLine{}
\DoxyCodeLine{sudo kdb global-umount tracer}
\DoxyCodeLine{}
\DoxyCodeLine{\# spec is always mounted by default}
\DoxyCodeLine{sudo kdb global-mount}
\DoxyCodeLine{\#> spec}
\DoxyCodeLine{}
\DoxyCodeLine{sudo kdb global-umount spec}
\DoxyCodeLine{}
\DoxyCodeLine{sudo kdb global-mount}
\DoxyCodeLine{\#>}
\end{DoxyCode}



\begin{DoxyItemize}
\item \mbox{\hyperlink{doc_help_kdb-global-mount_md}{kdb-\/global-\/mount(1)}}.
\item \mbox{\hyperlink{doc_help_elektra-mounting_md}{elektra-\/mounting(7)}}.
\item \mbox{\hyperlink{doc_dev_plugins-framework_md}{elektra-\/plugins-\/framework(7)}}. 
\end{DoxyItemize}