\hypertarget{glib_8h}{}\section{glib.\+h File Reference}
\label{glib_8h}\index{glib.h@{glib.h}}


Declarations for the glib I/O binding.  


{\ttfamily \#include $<$glib.\+h$>$}\newline
{\ttfamily \#include $<$kdbio.\+h$>$}\newline
Include dependency graph for glib.\+h\+:
\nopagebreak
\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=147pt]{glib_8h__incl}
\end{center}
\end{figure}
This graph shows which files directly or indirectly include this file\+:
\nopagebreak
\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=142pt]{glib_8h__dep__incl}
\end{center}
\end{figure}
\subsection*{Functions}
\begin{DoxyCompactItemize}
\item 
\mbox{\hyperlink{kdbio_8h_aabcd87b8c09d4d4c1033fc1baa417391}{Elektra\+Io\+Interface}} $\ast$ \mbox{\hyperlink{glib_8h_ad33cf575045009d1fcacc9fae9b2ef67}{elektra\+Io\+Glib\+New}} (G\+Main\+Context $\ast$context)
\begin{DoxyCompactList}\small\item\em Create and initialize a new I/O binding. \end{DoxyCompactList}\end{DoxyCompactItemize}


\subsection{Detailed Description}
Declarations for the glib I/O binding. 

\begin{DoxyCopyright}{Copyright}
B\+SD License (see L\+I\+C\+E\+N\+S\+E.\+md or \href{https://www.libelektra.org}{\texttt{ https\+://www.\+libelektra.\+org}}) 
\end{DoxyCopyright}


\subsection{Function Documentation}
\mbox{\Hypertarget{glib_8h_ad33cf575045009d1fcacc9fae9b2ef67}\label{glib_8h_ad33cf575045009d1fcacc9fae9b2ef67}} 
\index{glib.h@{glib.h}!elektraIoGlibNew@{elektraIoGlibNew}}
\index{elektraIoGlibNew@{elektraIoGlibNew}!glib.h@{glib.h}}
\subsubsection{\texorpdfstring{elektraIoGlibNew()}{elektraIoGlibNew()}}
{\footnotesize\ttfamily \mbox{\hyperlink{kdbio_8h_aabcd87b8c09d4d4c1033fc1baa417391}{Elektra\+Io\+Interface}}$\ast$ elektra\+Io\+Glib\+New (\begin{DoxyParamCaption}\item[{G\+Main\+Context $\ast$}]{context }\end{DoxyParamCaption})}



Create and initialize a new I/O binding. 


\begin{DoxyParams}{Parameters}
{\em context} & Context to use for I/O operations \\
\hline
\end{DoxyParams}
\begin{DoxyReturn}{Returns}
Populated I/O interface 
\end{DoxyReturn}
