\hypertarget{kdbioprivate_8h}{}\section{kdbioprivate.\+h File Reference}
\label{kdbioprivate_8h}\index{kdbioprivate.h@{kdbioprivate.h}}


Private Elektra-\/\+IO structures for I/O bindings, plugins and applications.  


{\ttfamily \#include \char`\"{}kdbio.\+h\char`\"{}}\newline
Include dependency graph for kdbioprivate.\+h\+:
\nopagebreak
\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=167pt]{kdbioprivate_8h__incl}
\end{center}
\end{figure}
This graph shows which files directly or indirectly include this file\+:
\nopagebreak
\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=212pt]{kdbioprivate_8h__dep__incl}
\end{center}
\end{figure}


\subsection{Detailed Description}
Private Elektra-\/\+IO structures for I/O bindings, plugins and applications. 

\begin{DoxyCopyright}{Copyright}
B\+SD License (see L\+I\+C\+E\+N\+S\+E.\+md or \href{https://www.libelektra.org}{\texttt{ https\+://www.\+libelektra.\+org}}) 
\end{DoxyCopyright}
