\hypertarget{structSomeIoLibHandle}{}\section{Some\+Io\+Lib\+Handle Struct Reference}
\label{structSomeIoLibHandle}\index{SomeIoLibHandle@{SomeIoLibHandle}}


Example I/O management library data structure.  


\subsection*{Public Attributes}
\begin{DoxyCompactItemize}
\item 
\mbox{\Hypertarget{structSomeIoLibHandle_a3268457567f3ec3094c96c4bdf8424e5}\label{structSomeIoLibHandle_a3268457567f3ec3094c96c4bdf8424e5}} 
void $\ast$ \mbox{\hyperlink{structSomeIoLibHandle_a3268457567f3ec3094c96c4bdf8424e5}{data}}
\begin{DoxyCompactList}\small\item\em Let\textquotesingle{}s you access the context you supplied to the I/O management library. \end{DoxyCompactList}\end{DoxyCompactItemize}


\subsection{Detailed Description}
Example I/O management library data structure. 

The documentation for this struct was generated from the following file\+:\begin{DoxyCompactItemize}
\item 
\mbox{\hyperlink{io__doc_8c}{io\+\_\+doc.\+c}}\end{DoxyCompactItemize}
