\label{doc_decisions_library_directory_structure_md_md_doc_decisions_library_directory_structure}%
\Hypertarget{doc_decisions_library_directory_structure_md_md_doc_decisions_library_directory_structure}%
 \hypertarget{doc_decisions_library_directory_structure_md_autotoc_md1971}{}\doxysection{Problem}\label{doc_decisions_library_directory_structure_md_autotoc_md1971}
Currently src/libs/elektra contains the source of several libraries. Each of the libraries should have its own folder. Furthermore, we need to allow rust source to exist in parallel.\hypertarget{doc_decisions_library_directory_structure_md_autotoc_md1972}{}\doxysection{Constraints}\label{doc_decisions_library_directory_structure_md_autotoc_md1972}
\hypertarget{doc_decisions_library_directory_structure_md_autotoc_md1973}{}\doxysection{Assumptions}\label{doc_decisions_library_directory_structure_md_autotoc_md1973}
\hypertarget{doc_decisions_library_directory_structure_md_autotoc_md1974}{}\doxysection{Considered Alternatives}\label{doc_decisions_library_directory_structure_md_autotoc_md1974}
\hypertarget{doc_decisions_library_directory_structure_md_autotoc_md1975}{}\doxysection{Decision}\label{doc_decisions_library_directory_structure_md_autotoc_md1975}
\hypertarget{doc_decisions_library_directory_structure_md_autotoc_md1976}{}\doxysection{Rationale}\label{doc_decisions_library_directory_structure_md_autotoc_md1976}
\hypertarget{doc_decisions_library_directory_structure_md_autotoc_md1977}{}\doxysection{Implications}\label{doc_decisions_library_directory_structure_md_autotoc_md1977}
\hypertarget{doc_decisions_library_directory_structure_md_autotoc_md1978}{}\doxysection{Related Decisions}\label{doc_decisions_library_directory_structure_md_autotoc_md1978}
\hypertarget{doc_decisions_library_directory_structure_md_autotoc_md1979}{}\doxysection{Notes}\label{doc_decisions_library_directory_structure_md_autotoc_md1979}
