
\begin{DoxyItemize}
\item infos = Information about the doc plugin is in keys below
\item infos/author = Markus Raab \href{mailto:elektra@libelektra.org}{\texttt{ elektra@libelektra.\+org}}
\item infos/licence = BSD
\item infos/provides =
\item infos/needs =
\item infos/recommends =
\item infos/placements = prerollback rollback postrollback getresolver pregetstorage getstorage procgetstorage postgetstorage setresolver presetstorage setstorage precommit commit postcommit
\item infos/status = nodep libc experimental discouraged -\/1000000
\item infos/metadata =
\item infos/description = documentation plugin without functionality
\end{DoxyItemize}\hypertarget{md_src_plugins_doc_README_src_plugins_doc_README_md}{}\doxysection{Introduction}\label{md_src_plugins_doc_README_src_plugins_doc_README_md}
This plugin has no functionality. It contains documentation explaining the basic makeup of a function. \href{https://doc.libelektra.org/api/master/html/group__plugin.html}{\texttt{ The latest version of this documentation can be found on our documentation site.}}\hypertarget{md_src_plugins_doc_README_autotoc_md171}{}\doxysection{Installation}\label{md_src_plugins_doc_README_autotoc_md171}
See \mbox{\hyperlink{doc_INSTALL_md}{installation}}. The package is called {\ttfamily libelektra5-\/experimental}. 