\label{doc_WHO_md_md_doc_WHO}%
\Hypertarget{doc_WHO_md_md_doc_WHO}%
 Elektra has three different main targets.\hypertarget{doc_WHO_md_autotoc_md4581}{}\doxysection{Desktop}\label{doc_WHO_md_autotoc_md4581}
Elektra allows applications to read and write from a global configuration tree. We miss a specification (schema) so that these configuration values can be shared (integrated).

Known users\+:


\begin{DoxyItemize}
\item \href{https://oyranos.org}{\texttt{ Oyranos}}
\item \href{http://lcdproc.omnipotent.net/}{\texttt{ LCDproc}} (in progress)
\item \href{https://kde.org}{\texttt{ KDE}} (in progress)
\item \href{https://www.openhab.org/}{\texttt{ Open\+HAB}} (in progress)
\end{DoxyItemize}\hypertarget{doc_WHO_md_autotoc_md4582}{}\doxysection{Embedded}\label{doc_WHO_md_autotoc_md4582}
Elektra is on the frontier for embedded systems because of its tiny core and the many possibilities with its plugins.

Known users\+:


\begin{DoxyItemize}
\item Open\+WRT (distribution)
\item Broadcom (blue-\/ray devices)
\item Kapsch (cameras)
\item Toshiba (TVs)
\end{DoxyItemize}\hypertarget{doc_WHO_md_autotoc_md4583}{}\doxysection{Server}\label{doc_WHO_md_autotoc_md4583}
Elektra is ideal suited for a local configuration storage by mounting existing configuration files into the global tree. Nodes using Elektra can be connected by already existing configuration management tools.

Known users\+:


\begin{DoxyItemize}
\item Allianz
\item TU Wien
\item Other Universities
\end{DoxyItemize}\hypertarget{doc_WHO_md_autotoc_md4584}{}\doxysection{Further Readings}\label{doc_WHO_md_autotoc_md4584}

\begin{DoxyItemize}
\item Continue reading\+: \mbox{\hyperlink{doc_WHY_md}{Why should I use Elektra?}} 
\end{DoxyItemize}