\label{doc_usecases_elektra_web_UC_view_config_md_md_doc_usecases_elektra_web_UC_view_config}%
\Hypertarget{doc_usecases_elektra_web_UC_view_config_md_md_doc_usecases_elektra_web_UC_view_config}%
 \hypertarget{doc_usecases_elektra_web_UC_view_config_md_autotoc_md4529}{}\doxysection{Summary}\label{doc_usecases_elektra_web_UC_view_config_md_autotoc_md4529}

\begin{DoxyItemize}
\item {\bfseries{Title\+:}} View configuration of an instance
\item {\bfseries{Scope\+:}} Configuration
\item {\bfseries{Level\+:}} User Goal
\item {\bfseries{Actors\+:}} User (usually a sysadmin)
\item {\bfseries{Brief\+:}} User views the configuration of an instance via the elektra-\/web client.
\end{DoxyItemize}\hypertarget{doc_usecases_elektra_web_UC_view_config_md_autotoc_md4530}{}\doxysection{Scenarios}\label{doc_usecases_elektra_web_UC_view_config_md_autotoc_md4530}

\begin{DoxyItemize}
\item {\bfseries{Precondition\+:}} Setup instance.
\item {\bfseries{Main success scenario\+:}} User opens the configuration of an instance. The user is presented with an interactive tree view.
\item {\bfseries{Alternative scenario\+:}} Instance not online. The user is informed about the problem.
\item {\bfseries{Error scenario\+:}} Technical problems while configuring the instance. The user is informed about the problem.
\item {\bfseries{Postcondition\+:}} The interactive tree view for configuration is visible.
\item {\bfseries{Non-\/functional Constraints\+:}} -\/ 
\end{DoxyItemize}