
\begin{DoxyItemize}
\item infos =
\end{DoxyItemize}

infos/author =
\begin{DoxyItemize}
\item infos/licence = BSD
\item infos/status = experimental maintained
\item infos/provides =
\item infos/description =
\end{DoxyItemize}\hypertarget{md_src_libs_template_README_src_libs_template_README_md}{}\doxysubsection{Introduction}\label{md_src_libs_template_README_src_libs_template_README_md}
Explain what this library does. What is its purpose? What is its responsibility?\hypertarget{md_src_libs_template_README_autotoc_md42}{}\doxysubsection{Files}\label{md_src_libs_template_README_autotoc_md42}

\begin{DoxyItemize}
\item Link to the header files.
\item Name of {\ttfamily .so} file.
\end{DoxyItemize}\hypertarget{md_src_libs_template_README_autotoc_md43}{}\doxysubsection{Classes}\label{md_src_libs_template_README_autotoc_md43}
Explain which \mbox{\hyperlink{doc_help_elektra-glossary_md}{classes}} the library contains. The method names are {\ttfamily elektra\+Class$\ast$}. Add a link to the API documentation.\hypertarget{md_src_libs_template_README_autotoc_md44}{}\doxysubsection{Dependencies}\label{md_src_libs_template_README_autotoc_md44}
None.\hypertarget{md_src_libs_template_README_autotoc_md45}{}\doxysubsection{Quality}\label{md_src_libs_template_README_autotoc_md45}
More information than {\ttfamily infos/status} including Performance Characteristics. Mention open issues here.\hypertarget{md_src_libs_template_README_autotoc_md46}{}\doxysubsection{Further Links}\label{md_src_libs_template_README_autotoc_md46}
Link to tutorials etc.\hypertarget{md_src_libs_template_README_autotoc_md47}{}\doxysubsection{Notes}\label{md_src_libs_template_README_autotoc_md47}
None. 