\hypertarget{structkdb_1_1tools_1_1ToolException}{}\doxysection{kdb\+::tools\+::Tool\+Exception Struct Reference}
\label{structkdb_1_1tools_1_1ToolException}\index{kdb::tools::ToolException@{kdb::tools::ToolException}}


All exceptions from the elektratools library are derived from this exception.  




{\ttfamily \#include $<$toolexcept.\+hpp$>$}



Inherits std\+::runtime\+\_\+error.



Inherited by kdb\+::tools\+::\+Backend\+Check\+Exception, kdb\+::tools\+::\+Parse\+Exception, kdb\+::tools\+::\+Plugin\+Check\+Exception, kdb\+::tools\+::helper\+::\+Invalid\+Rebase\+Exception, and kdb\+::tools\+::merging\+::\+Invalid\+Conflict\+Operation.



\doxysubsection{Detailed Description}
All exceptions from the elektratools library are derived from this exception. 

The documentation for this struct was generated from the following file\+:\begin{DoxyCompactItemize}
\item 
\mbox{\hyperlink{toolexcept_8hpp}{toolexcept.\+hpp}}\end{DoxyCompactItemize}
