\hypertarget{doc_decisions_ingroup_removal_md_autotoc_md1252}{}\doxysection{Problem}\label{doc_decisions_ingroup_removal_md_autotoc_md1252}
Currently, an error or warning message in elektra causes the following line to be shown\+:


\begin{DoxyCode}{0}
\DoxyCodeLine{Ingroup: <group>}
\end{DoxyCode}


Its main purpose is to show the user if the error occurred in either {\ttfamily kdb}, {\ttfamily module} or {\ttfamily plugin}.

The problem is that this message is of no value for the user and increases the verbosity of the message.\hypertarget{doc_decisions_ingroup_removal_md_autotoc_md1253}{}\doxysection{Constraints}\label{doc_decisions_ingroup_removal_md_autotoc_md1253}
\hypertarget{doc_decisions_ingroup_removal_md_autotoc_md1254}{}\doxysection{Assumptions}\label{doc_decisions_ingroup_removal_md_autotoc_md1254}
\hypertarget{doc_decisions_ingroup_removal_md_autotoc_md1255}{}\doxysection{Considered Alternatives}\label{doc_decisions_ingroup_removal_md_autotoc_md1255}
\hypertarget{doc_decisions_ingroup_removal_md_autotoc_md1256}{}\doxysection{Decision}\label{doc_decisions_ingroup_removal_md_autotoc_md1256}
The {\ttfamily ingroup} message will be removed as it does not yield any notable benefit.\hypertarget{doc_decisions_ingroup_removal_md_autotoc_md1257}{}\doxysection{Rationale}\label{doc_decisions_ingroup_removal_md_autotoc_md1257}
\hypertarget{doc_decisions_ingroup_removal_md_autotoc_md1258}{}\doxysection{Implications}\label{doc_decisions_ingroup_removal_md_autotoc_md1258}
The {\ttfamily ingroup} will be removed from all implementations, metakeys and tests.\hypertarget{doc_decisions_ingroup_removal_md_autotoc_md1259}{}\doxysection{Related Decisions}\label{doc_decisions_ingroup_removal_md_autotoc_md1259}
See \mbox{\hyperlink{doc_decisions_error_codes_md}{Error concept}}\hypertarget{doc_decisions_ingroup_removal_md_autotoc_md1260}{}\doxysection{Notes}\label{doc_decisions_ingroup_removal_md_autotoc_md1260}
