\hypertarget{doc_decisions_warning-array_md_autotoc_md1388}{}\doxysection{Problem}\label{doc_decisions_warning-array_md_autotoc_md1388}
Currently multiple warnings are saved in an elektra non-\/conforming array notation which is limited to 100 entries. The notation of {\ttfamily \#00} is against the design \mbox{\hyperlink{doc_decisions_array_md}{decision made}}.\hypertarget{doc_decisions_warning-array_md_autotoc_md1389}{}\doxysection{Constraints}\label{doc_decisions_warning-array_md_autotoc_md1389}
\hypertarget{doc_decisions_warning-array_md_autotoc_md1390}{}\doxysection{Assumptions}\label{doc_decisions_warning-array_md_autotoc_md1390}
\hypertarget{doc_decisions_warning-array_md_autotoc_md1391}{}\doxysection{Considered Alternatives}\label{doc_decisions_warning-array_md_autotoc_md1391}
\hypertarget{doc_decisions_warning-array_md_autotoc_md1392}{}\doxysection{Decision}\label{doc_decisions_warning-array_md_autotoc_md1392}
The format should be aligned with the correct array notation, starting with {\ttfamily \#0}. The maximum number of warnings will stay at 100 entries ({\ttfamily \#0} -\/ {\ttfamily \#\+\_\+99}).\hypertarget{doc_decisions_warning-array_md_autotoc_md1393}{}\doxysection{Rationale}\label{doc_decisions_warning-array_md_autotoc_md1393}
\hypertarget{doc_decisions_warning-array_md_autotoc_md1394}{}\doxysection{Implications}\label{doc_decisions_warning-array_md_autotoc_md1394}
To keep the ordering we add an underscore {\ttfamily \+\_\+} once we go to beyond 10 warnings ({\ttfamily \#\+\_\+10}).\hypertarget{doc_decisions_warning-array_md_autotoc_md1395}{}\doxysection{Related Decisions}\label{doc_decisions_warning-array_md_autotoc_md1395}

\begin{DoxyItemize}
\item \mbox{\hyperlink{doc_decisions_array_md}{Array}}
\end{DoxyItemize}\hypertarget{doc_decisions_warning-array_md_autotoc_md1396}{}\doxysection{Notes}\label{doc_decisions_warning-array_md_autotoc_md1396}
