\hypertarget{doc_help_kdb-global-umount_md_autotoc_md1704}{}\doxysection{S\+Y\+N\+O\+P\+S\+IS}\label{doc_help_kdb-global-umount_md_autotoc_md1704}
{\ttfamily kdb global-\/umount $<$name$>$}\hypertarget{doc_help_kdb-global-umount_md_autotoc_md1705}{}\doxysection{D\+E\+S\+C\+R\+I\+P\+T\+I\+ON}\label{doc_help_kdb-global-umount_md_autotoc_md1705}
Unmount a global plugin from the key database.\hypertarget{doc_help_kdb-global-umount_md_autotoc_md1706}{}\doxysection{O\+P\+T\+I\+O\+NS}\label{doc_help_kdb-global-umount_md_autotoc_md1706}

\begin{DoxyItemize}
\item {\ttfamily -\/H}, {\ttfamily -\/-\/help}\+: Show the man page.
\item {\ttfamily -\/V}, {\ttfamily -\/-\/version}\+: Print version info.
\item {\ttfamily -\/p}, {\ttfamily -\/-\/profile $<$profile$>$}\+: Use a different kdb profile.
\item {\ttfamily -\/C}, {\ttfamily -\/-\/color $<$when$>$}\+: Print never/auto(default)/always colored output.
\end{DoxyItemize}\hypertarget{doc_help_kdb-global-umount_md_autotoc_md1707}{}\doxysection{E\+X\+A\+M\+P\+L\+ES}\label{doc_help_kdb-global-umount_md_autotoc_md1707}

\begin{DoxyCode}{0}
\DoxyCodeLine{\# Backup-\/and-\/Restore: system/elektra/globalplugins}
\DoxyCodeLine{}
\DoxyCodeLine{sudo kdb global-\/mount tracer}
\DoxyCodeLine{}
\DoxyCodeLine{sudo kdb global-\/mount}
\DoxyCodeLine{\# STDOUT-\/REGEX: .*spec⏎tracer.*}
\DoxyCodeLine{}
\DoxyCodeLine{sudo kdb global-\/umount tracer}
\DoxyCodeLine{}
\DoxyCodeLine{\# spec is always mounted by default}
\DoxyCodeLine{sudo kdb global-\/mount}
\DoxyCodeLine{\#> spec}
\DoxyCodeLine{}
\DoxyCodeLine{sudo kdb global-\/umount spec}
\DoxyCodeLine{}
\DoxyCodeLine{sudo kdb global-\/mount}
\DoxyCodeLine{\#>}
\end{DoxyCode}
\hypertarget{doc_help_kdb-global-umount_md_autotoc_md1708}{}\doxysection{S\+E\+E A\+L\+SO}\label{doc_help_kdb-global-umount_md_autotoc_md1708}

\begin{DoxyItemize}
\item \mbox{\hyperlink{doc_help_kdb-global-mount_md}{kdb-\/global-\/mount(1)}}.
\item \mbox{\hyperlink{doc_help_elektra-mounting_md}{elektra-\/mounting(7)}}.
\item \mbox{\hyperlink{doc_dev_plugins-framework_md}{elektra-\/plugins-\/framework(7)}}. 
\end{DoxyItemize}