\hypertarget{doc_help_kdb-list-tools_md_autotoc_md1728}{}\doxysection{S\+Y\+N\+O\+P\+S\+IS}\label{doc_help_kdb-list-tools_md_autotoc_md1728}
{\ttfamily kdb list-\/tools}\hypertarget{doc_help_kdb-list-tools_md_autotoc_md1729}{}\doxysection{D\+E\+S\+C\+R\+I\+P\+T\+I\+ON}\label{doc_help_kdb-list-tools_md_autotoc_md1729}
This command lists all the external tools that are available to Elektra. In the first line it prints where external tools are located.

The tool itself is extern.\hypertarget{doc_help_kdb-list-tools_md_autotoc_md1730}{}\doxysection{E\+N\+V\+I\+R\+O\+N\+M\+E\+NT}\label{doc_help_kdb-list-tools_md_autotoc_md1730}

\begin{DoxyItemize}
\item {\ttfamily K\+D\+B\+\_\+\+E\+X\+E\+C\+\_\+\+P\+A\+TH}\+: Path to additional external tools. Can contain multiple paths separated with \+:.
\end{DoxyItemize}\hypertarget{doc_help_kdb-list-tools_md_autotoc_md1731}{}\doxysection{O\+P\+T\+I\+O\+NS}\label{doc_help_kdb-list-tools_md_autotoc_md1731}
Currently no option provided.\hypertarget{doc_help_kdb-list-tools_md_autotoc_md1732}{}\doxysection{S\+E\+E A\+L\+SO}\label{doc_help_kdb-list-tools_md_autotoc_md1732}

\begin{DoxyItemize}
\item {\ttfamily kdb list-\/commands} to list internal kdb commands 
\end{DoxyItemize}