\hypertarget{doc_usecases_elektra_web_UC_setup_instance_md_autotoc_md2827}{}\doxysection{Summary}\label{doc_usecases_elektra_web_UC_setup_instance_md_autotoc_md2827}

\begin{DoxyItemize}
\item {\bfseries{Title\+:}} Setup instance
\item {\bfseries{Scope\+:}} Setup
\item {\bfseries{Level\+:}} User Goal
\item {\bfseries{Actors\+:}} User (usually a sysadmin)
\item {\bfseries{Brief\+:}} User sets up a daemon on the instance and connects it to elektra-\/web.
\end{DoxyItemize}\hypertarget{doc_usecases_elektra_web_UC_setup_instance_md_autotoc_md2828}{}\doxysection{Scenarios}\label{doc_usecases_elektra_web_UC_setup_instance_md_autotoc_md2828}

\begin{DoxyItemize}
\item {\bfseries{Main success scenario\+:}} User successfully sets up elektrad on the instance and connects it to elektra-\/web.
\item {\bfseries{Alternative scenario\+:}} Authentication issues when connecting the services, e.\+g. wrong A\+PI key.
\item {\bfseries{Alternative scenario\+:}} The instance is already connected to elektra-\/web. A message informs the user about this.
\item {\bfseries{Error scenario\+:}} Technical problems -\/ the user is informed about the problem.
\item {\bfseries{Postcondition\+:}} User can now access the instance via the client.
\item {\bfseries{Non-\/functional Constraints\+:}}
\begin{DoxyItemize}
\item Security mechanism 
\end{DoxyItemize}
\end{DoxyItemize}