\hypertarget{static_8c}{}\doxysection{static.\+c File Reference}
\label{static_8c}\index{static.c@{static.c}}
{\ttfamily \#include $<$stdlib.\+h$>$}\newline
{\ttfamily \#include $<$string.\+h$>$}\newline
{\ttfamily \#include $<$exported\+\_\+symbols.\+h$>$}\newline
{\ttfamily \#include $<$kdberrors.\+h$>$}\newline
{\ttfamily \#include $<$kdbmodule.\+h$>$}\newline
Include dependency graph for static.\+c\+:
\nopagebreak
\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=350pt]{static_8c__incl}
\end{center}
\end{figure}
\doxysubsection*{Functions}
\begin{DoxyCompactItemize}
\item 
int \mbox{\hyperlink{group__modules_gaa40915e67f973ccd5258aa450bd03585}{elektra\+Modules\+Init}} (Key\+Set $\ast$modules, Key $\ast$error)
\begin{DoxyCompactList}\small\item\em Initialises the module loading system. \end{DoxyCompactList}\item 
elektra\+Plugin\+Factory \mbox{\hyperlink{group__modules_ga09300fbf0e0cfc9dc80bb877b00117c0}{elektra\+Modules\+Load}} (Key\+Set $\ast$modules, const char $\ast$name, Key $\ast$error)
\begin{DoxyCompactList}\small\item\em Load a library with the given name. \end{DoxyCompactList}\item 
int \mbox{\hyperlink{group__modules_ga5646d92ffe3e1e04c4586d9c910ba6bd}{elektra\+Modules\+Close}} (Key\+Set $\ast$modules, Key $\ast$error)
\begin{DoxyCompactList}\small\item\em Close all modules. \end{DoxyCompactList}\end{DoxyCompactItemize}


\doxysubsection{Detailed Description}
\begin{DoxyCopyright}{Copyright}
B\+SD License (see L\+I\+C\+E\+N\+S\+E.\+md or \href{https://www.libelektra.org}{\texttt{ https\+://www.\+libelektra.\+org}}) 
\end{DoxyCopyright}
