Currently, an error or warning message in elektra causes the following line to be shown\+:


\begin{DoxyCode}
Ingroup: <group>
\end{DoxyCode}


Its main purpose is to show the user if the error occurred in either {\ttfamily kdb}, {\ttfamily module} or {\ttfamily plugin}.

The problem is that this message is of no value for the user and increases the verbosity of the message.

The {\ttfamily ingroup} message will be removed as it does not yield any notable benefit.

The {\ttfamily ingroup} will be removed from all implementations, metakeys and tests.

See \hyperlink{doc_decisions_error_codes_md}{Error concept}