
\begin{DoxyItemize}
\item {\bfseries Title\+:} Setup instance
\item {\bfseries Scope\+:} Setup
\item {\bfseries Level\+:} User Goal
\item {\bfseries Actors\+:} User (usually a sysadmin)
\item {\bfseries Brief\+:} User sets up a daemon on the instance and connects it to elektra-\/web.
\end{DoxyItemize}


\begin{DoxyItemize}
\item {\bfseries Main success scenario\+:} User successfully sets up elektrad on the instance and connects it to elektra-\/web.
\item {\bfseries Alternative scenario\+:} Authentication issues when connecting the services, e.\+g. wrong A\+PI key.
\item {\bfseries Alternative scenario\+:} The instance is already connected to elektra-\/web. A message informs the user about this.
\item {\bfseries Error scenario\+:} Technical problems -\/ the user is informed about the problem.
\item {\bfseries Postcondition\+:} User can now access the instance via the client.
\item {\bfseries Non-\/functional Constraints\+:}
\begin{DoxyItemize}
\item Security mechanism 
\end{DoxyItemize}
\end{DoxyItemize}