\hypertarget{classorg_1_1libelektra_1_1exception_1_1KeyException}{}\doxysection{org.\+libelektra.\+exception.\+Key\+Exception Class Reference}
\label{classorg_1_1libelektra_1_1exception_1_1KeyException}\index{org.libelektra.exception.KeyException@{org.libelektra.exception.KeyException}}


Indicates a generic exception in \mbox{\hyperlink{classorg_1_1libelektra_1_1Key}{Key}} occurred.  




Inheritance diagram for org.\+libelektra.\+exception.\+Key\+Exception\+:
\nopagebreak
\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=350pt]{classorg_1_1libelektra_1_1exception_1_1KeyException__inherit__graph}
\end{center}
\end{figure}


\doxysubsection{Detailed Description}
Indicates a generic exception in \mbox{\hyperlink{classorg_1_1libelektra_1_1Key}{Key}} occurred. 

The documentation for this class was generated from the following file\+:\begin{DoxyCompactItemize}
\item 
Key\+Exception.\+java\end{DoxyCompactItemize}
