
\begin{DoxyItemize}
\item infos = Information about the counter plugin is in keys below
\item infos/author = Markus Raab \href{mailto:elektra@libelektra.org}{\texttt{ elektra@libelektra.\+org}}
\item infos/licence = BSD
\item infos/provides = tracing
\item infos/needs =
\item infos/recommends =
\item infos/placements = pregetstorage
\item infos/status = maintained nodep configurable final global nodoc
\item infos/metadata =
\item infos/description = counts and prints usage statistics
\end{DoxyItemize}\hypertarget{md_src_plugins_counter_README_src_plugins_counter_README_md}{}\doxysection{Introduction}\label{md_src_plugins_counter_README_src_plugins_counter_README_md}
Counts and prints usage statistics. Only useful for debugging the plugin framework.\hypertarget{md_src_plugins_counter_README_autotoc_md94}{}\doxysection{Installation}\label{md_src_plugins_counter_README_autotoc_md94}
See \mbox{\hyperlink{doc_INSTALL_md}{installation}}. The package is called {\ttfamily libelektra5-\/extra}.\hypertarget{md_src_plugins_counter_README_autotoc_md95}{}\doxysection{Module Loading}\label{md_src_plugins_counter_README_autotoc_md95}
Will not log when loaded as module (config {\ttfamily /module} present), unless {\ttfamily /logmodule} is set\+:


\begin{DoxyCode}{0}
\DoxyCodeLine{kdb plugin-\/check -\/c "{}logmodule="{} counter}

\end{DoxyCode}
 