\hypertarget{classorg_1_1libelektra_1_1exception_1_1KeyMetaException}{}\doxysection{org.\+libelektra.\+exception.\+Key\+Meta\+Exception Class Reference}
\label{classorg_1_1libelektra_1_1exception_1_1KeyMetaException}\index{org.libelektra.exception.KeyMetaException@{org.libelektra.exception.KeyMetaException}}


Indicates \mbox{\hyperlink{classorg_1_1libelektra_1_1Key_a5a5f568f1e5e6bcf5dcd791daeada1e3}{Key\#copy\+Meta(\+Key, String)}}, \mbox{\hyperlink{classorg_1_1libelektra_1_1Key_ad88025a33da3657edcc801cd2e0a94a5}{Key\#copy\+All\+Meta(\+Key)}}, \mbox{\hyperlink{classorg_1_1libelektra_1_1Key_ae247f420344b10e1c4e9eabbf51c4b25}{Key\#set\+Meta(\+String, String)}} or \mbox{\hyperlink{classorg_1_1libelektra_1_1Key_a08987c2ad8e34d7e897f8a87f6abc1c0}{Key\#remove\+Meta(\+String)}} failed because the key name is invalid, the meta information is read-\/only or there where allocation problems in the native library.  




Inheritance diagram for org.\+libelektra.\+exception.\+Key\+Meta\+Exception\+:
\nopagebreak
\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=216pt]{classorg_1_1libelektra_1_1exception_1_1KeyMetaException__inherit__graph}
\end{center}
\end{figure}


Collaboration diagram for org.\+libelektra.\+exception.\+Key\+Meta\+Exception\+:
\nopagebreak
\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=216pt]{classorg_1_1libelektra_1_1exception_1_1KeyMetaException__coll__graph}
\end{center}
\end{figure}


\doxysubsection{Detailed Description}
Indicates \mbox{\hyperlink{classorg_1_1libelektra_1_1Key_a5a5f568f1e5e6bcf5dcd791daeada1e3}{Key\#copy\+Meta(\+Key, String)}}, \mbox{\hyperlink{classorg_1_1libelektra_1_1Key_ad88025a33da3657edcc801cd2e0a94a5}{Key\#copy\+All\+Meta(\+Key)}}, \mbox{\hyperlink{classorg_1_1libelektra_1_1Key_ae247f420344b10e1c4e9eabbf51c4b25}{Key\#set\+Meta(\+String, String)}} or \mbox{\hyperlink{classorg_1_1libelektra_1_1Key_a08987c2ad8e34d7e897f8a87f6abc1c0}{Key\#remove\+Meta(\+String)}} failed because the key name is invalid, the meta information is read-\/only or there where allocation problems in the native library. 

The documentation for this class was generated from the following file\+:\begin{DoxyCompactItemize}
\item 
Key\+Meta\+Exception.\+java\end{DoxyCompactItemize}
