\hypertarget{classorg_1_1libelektra_1_1exception_1_1KeyReleasedException}{}\doxysection{org.\+libelektra.\+exception.\+Key\+Released\+Exception Class Reference}
\label{classorg_1_1libelektra_1_1exception_1_1KeyReleasedException}\index{org.libelektra.exception.KeyReleasedException@{org.libelektra.exception.KeyReleasedException}}


Indicates that an already released \mbox{\hyperlink{classorg_1_1libelektra_1_1Key}{Key}} has been accessed.  




Inherits Runtime\+Exception.



\doxysubsection{Detailed Description}
Indicates that an already released \mbox{\hyperlink{classorg_1_1libelektra_1_1Key}{Key}} has been accessed. 

The documentation for this class was generated from the following file\+:\begin{DoxyCompactItemize}
\item 
Key\+Released\+Exception.\+java\end{DoxyCompactItemize}
