\hypertarget{classorg_1_1libelektra_1_1exception_1_1KeySetAppendException}{}\doxysection{org.\+libelektra.\+exception.\+Key\+Set\+Append\+Exception Class Reference}
\label{classorg_1_1libelektra_1_1exception_1_1KeySetAppendException}\index{org.libelektra.exception.KeySetAppendException@{org.libelektra.exception.KeySetAppendException}}


Indicates \mbox{\hyperlink{classorg_1_1libelektra_1_1KeySet_a7457ab3aa74323af26c80b05fe5607b5}{Key\+Set\#append(\+Key\+Set)}} or \mbox{\hyperlink{classorg_1_1libelektra_1_1KeySet_a0eff916445842bb1e47fe398efc19538}{Key\+Set\#append(\+Key)}} failed, which also might have freed the passed key or a key of the passed key set.  




Inheritance diagram for org.\+libelektra.\+exception.\+Key\+Set\+Append\+Exception\+:
\nopagebreak
\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=216pt]{classorg_1_1libelektra_1_1exception_1_1KeySetAppendException__inherit__graph}
\end{center}
\end{figure}


Collaboration diagram for org.\+libelektra.\+exception.\+Key\+Set\+Append\+Exception\+:
\nopagebreak
\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=216pt]{classorg_1_1libelektra_1_1exception_1_1KeySetAppendException__coll__graph}
\end{center}
\end{figure}


\doxysubsection{Detailed Description}
Indicates \mbox{\hyperlink{classorg_1_1libelektra_1_1KeySet_a7457ab3aa74323af26c80b05fe5607b5}{Key\+Set\#append(\+Key\+Set)}} or \mbox{\hyperlink{classorg_1_1libelektra_1_1KeySet_a0eff916445842bb1e47fe398efc19538}{Key\+Set\#append(\+Key)}} failed, which also might have freed the passed key or a key of the passed key set. 

The documentation for this class was generated from the following file\+:\begin{DoxyCompactItemize}
\item 
Key\+Set\+Append\+Exception.\+java\end{DoxyCompactItemize}
