\hypertarget{classorg_1_1libelektra_1_1exception_1_1KeyStringValueException}{}\doxysection{org.\+libelektra.\+exception.\+Key\+String\+Value\+Exception Class Reference}
\label{classorg_1_1libelektra_1_1exception_1_1KeyStringValueException}\index{org.libelektra.exception.KeyStringValueException@{org.libelektra.exception.KeyStringValueException}}


Indicates a \mbox{\hyperlink{classorg_1_1libelektra_1_1Key}{key\textquotesingle{}s}} underlying native key value is not of type string, and therefore is not compatible with the invoked functionality raising this exception.  




Inherits Illegal\+State\+Exception.



\doxysubsection{Detailed Description}
Indicates a \mbox{\hyperlink{classorg_1_1libelektra_1_1Key}{key\textquotesingle{}s}} underlying native key value is not of type string, and therefore is not compatible with the invoked functionality raising this exception. 

The documentation for this class was generated from the following file\+:\begin{DoxyCompactItemize}
\item 
Key\+String\+Value\+Exception.\+java\end{DoxyCompactItemize}
