\hypertarget{classorg_1_1libelektra_1_1exception_1_1KeyCreateFailedException}{}\doxysection{org.\+libelektra.\+exception.\+Key\+Create\+Failed\+Exception Class Reference}
\label{classorg_1_1libelektra_1_1exception_1_1KeyCreateFailedException}\index{org.libelektra.exception.KeyCreateFailedException@{org.libelektra.exception.KeyCreateFailedException}}


Indicates \mbox{\hyperlink{classorg_1_1libelektra_1_1Key_a89a4a4cc6e02ba1656f9945485f87752}{Key\#create(\+String, Key...)}} or \mbox{\hyperlink{}{Key\#create(\+String, Object, Key...)}} failed because the key name is invalid or there where allocation problems in the native library.  




Inheritance diagram for org.\+libelektra.\+exception.\+Key\+Create\+Failed\+Exception\+:
\nopagebreak
\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=223pt]{classorg_1_1libelektra_1_1exception_1_1KeyCreateFailedException__inherit__graph}
\end{center}
\end{figure}


Collaboration diagram for org.\+libelektra.\+exception.\+Key\+Create\+Failed\+Exception\+:
\nopagebreak
\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=223pt]{classorg_1_1libelektra_1_1exception_1_1KeyCreateFailedException__coll__graph}
\end{center}
\end{figure}


\doxysubsection{Detailed Description}
Indicates \mbox{\hyperlink{classorg_1_1libelektra_1_1Key_a89a4a4cc6e02ba1656f9945485f87752}{Key\#create(\+String, Key...)}} or \mbox{\hyperlink{}{Key\#create(\+String, Object, Key...)}} failed because the key name is invalid or there where allocation problems in the native library. 

The documentation for this class was generated from the following file\+:\begin{DoxyCompactItemize}
\item 
Key\+Create\+Failed\+Exception.\+java\end{DoxyCompactItemize}
