\hypertarget{classorg_1_1libelektra_1_1exception_1_1KeySetNameFailedException}{}\doxysection{org.\+libelektra.\+exception.\+Key\+Set\+Name\+Failed\+Exception Class Reference}
\label{classorg_1_1libelektra_1_1exception_1_1KeySetNameFailedException}\index{org.libelektra.exception.KeySetNameFailedException@{org.libelektra.exception.KeySetNameFailedException}}


Indicates \mbox{\hyperlink{classorg_1_1libelektra_1_1Key_a869a1de0eafbc16916807f2f5a1cb335}{Key\#set\+Name(\+String)}} or \mbox{\hyperlink{classorg_1_1libelektra_1_1Key_aa64d0b1a3ea8e2817da9492c1ba43f65}{Key\#set\+Base\+Name(\+String)}} failed because the key name is invalid, the key was inserted in a key set before, the key name is read-\/only For there where allocation problems in the native library.  




Inheritance diagram for org.\+libelektra.\+exception.\+Key\+Set\+Name\+Failed\+Exception\+:
\nopagebreak
\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=236pt]{classorg_1_1libelektra_1_1exception_1_1KeySetNameFailedException__inherit__graph}
\end{center}
\end{figure}


Collaboration diagram for org.\+libelektra.\+exception.\+Key\+Set\+Name\+Failed\+Exception\+:
\nopagebreak
\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=236pt]{classorg_1_1libelektra_1_1exception_1_1KeySetNameFailedException__coll__graph}
\end{center}
\end{figure}


\doxysubsection{Detailed Description}
Indicates \mbox{\hyperlink{classorg_1_1libelektra_1_1Key_a869a1de0eafbc16916807f2f5a1cb335}{Key\#set\+Name(\+String)}} or \mbox{\hyperlink{classorg_1_1libelektra_1_1Key_aa64d0b1a3ea8e2817da9492c1ba43f65}{Key\#set\+Base\+Name(\+String)}} failed because the key name is invalid, the key was inserted in a key set before, the key name is read-\/only For there where allocation problems in the native library. 

The documentation for this class was generated from the following file\+:\begin{DoxyCompactItemize}
\item 
Key\+Set\+Name\+Failed\+Exception.\+java\end{DoxyCompactItemize}
