\label{doc_usecases_bindings_UC_existing_application_md_md_doc_usecases_bindings_UC_existing_application}%
\Hypertarget{doc_usecases_bindings_UC_existing_application_md_md_doc_usecases_bindings_UC_existing_application}%
 \hypertarget{doc_usecases_bindings_UC_existing_application_md_autotoc_md4796}{}\doxysection{Summary}\label{doc_usecases_bindings_UC_existing_application_md_autotoc_md4796}

\begin{DoxyItemize}
\item {\bfseries{Scope\+:}} API
\item {\bfseries{Level\+:}} Underwater
\item {\bfseries{Actors\+:}} API User
\item {\bfseries{Brief\+:}} Developer wants to use libelektra in an existing application written in another language than C
\item {\bfseries{Status\+:}} Draft
\end{DoxyItemize}\hypertarget{doc_usecases_bindings_UC_existing_application_md_autotoc_md4797}{}\doxysection{Scenarios}\label{doc_usecases_bindings_UC_existing_application_md_autotoc_md4797}

\begin{DoxyItemize}
\item {\bfseries{Precondition\+:}} A binding for the programming language must exist and the maintainers of the application decided to use libelektra and the developer must have write access to the application.
\item {\bfseries{Main success scenario\+:}} The application can be fully configured through libelektra
\item {\bfseries{Alternative scenario\+:}} Due to limitations of certain bindings, not everything but the majority can be configured
\item {\bfseries{Error scenario\+:}} The application might be put into a faulty state when the keys get modified by another application or manually
\item {\bfseries{Postcondition\+:}} The application is able to read and write with libelektra 
\end{DoxyItemize}