\label{doc_usecases_bindings_UC_new_application_md_md_doc_usecases_bindings_UC_new_application}%
\Hypertarget{doc_usecases_bindings_UC_new_application_md_md_doc_usecases_bindings_UC_new_application}%
 \hypertarget{doc_usecases_bindings_UC_new_application_md_autotoc_md4798}{}\doxysection{Summary}\label{doc_usecases_bindings_UC_new_application_md_autotoc_md4798}

\begin{DoxyItemize}
\item {\bfseries{Scope\+:}} API
\item {\bfseries{Level\+:}} Sea
\item {\bfseries{Actors\+:}} API User
\item {\bfseries{Brief\+:}} Developer wants to use libelektra in a new application written in another language than C
\item {\bfseries{Status\+:}} Draft
\end{DoxyItemize}\hypertarget{doc_usecases_bindings_UC_new_application_md_autotoc_md4799}{}\doxysection{Scenarios}\label{doc_usecases_bindings_UC_new_application_md_autotoc_md4799}

\begin{DoxyItemize}
\item {\bfseries{Precondition\+:}} A binding for the programming language must exist and the maintainers of the new application decided to use libelektra.
\item {\bfseries{Main success scenario\+:}} The application can be fully configured through libelektra
\item {\bfseries{Alternative scenario\+:}} Due to limitations of certain bindings, not everything but the majority can be configured
\item {\bfseries{Error scenario\+:}} The application might be put into a faulty state when the keys get modified by another application or manually
\item {\bfseries{Postcondition\+:}} The new application is able to read and write with libelektra 
\end{DoxyItemize}