\hypertarget{log_8c}{}\doxysection{log.\+c File Reference}
\label{log_8c}\index{log.c@{log.c}}


Non-\/\+C99 Logger Implementation.  


{\ttfamily \#include $<$stdio.\+h$>$}\newline
{\ttfamily \#include $<$kdblogger.\+h$>$}\newline
{\ttfamily \#include $<$syslog.\+h$>$}\newline
{\ttfamily \#include $<$kdbhelper.\+h$>$}\newline
{\ttfamily \#include $<$stdarg.\+h$>$}\newline
{\ttfamily \#include $<$stdlib.\+h$>$}\newline
{\ttfamily \#include $<$string.\+h$>$}\newline
Include dependency graph for log.\+c\+:
\nopagebreak
\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=350pt]{log_8c__incl}
\end{center}
\end{figure}


\doxysubsection{Detailed Description}
Non-\/\+C99 Logger Implementation. 

If you often change the file, you might want to set CMAKE\+\_\+\+LINK\+\_\+\+DEPENDS\+\_\+\+NO\+\_\+\+SHARED to avoid relinking everything.

Do not commit changes do this file, except if you want to change the default. In that case, make sure to update also doc/tutorials/logger.\+md

\begin{DoxyCopyright}{Copyright}
BSD License (see LICENSE.\+md or \href{https://www.libelektra.org}{\texttt{ https\+://www.\+libelektra.\+org}}) 
\end{DoxyCopyright}
