\hypertarget{md_doc_decisions_ingroup_removal_autotoc_md1999}{}\doxysection{Problem}\label{md_doc_decisions_ingroup_removal_autotoc_md1999}
Currently, an error or warning message in elektra causes the following line to be shown\+:


\begin{DoxyCode}{0}
\DoxyCodeLine{Ingroup: <group>}

\end{DoxyCode}


Its main purpose is to show the user if the error occurred in either {\ttfamily kdb}, {\ttfamily module} or {\ttfamily plugin}.

The problem is that this message is of no value for the user and increases the verbosity of the message.\hypertarget{md_doc_decisions_ingroup_removal_autotoc_md2000}{}\doxysection{Constraints}\label{md_doc_decisions_ingroup_removal_autotoc_md2000}
\hypertarget{md_doc_decisions_ingroup_removal_autotoc_md2001}{}\doxysection{Assumptions}\label{md_doc_decisions_ingroup_removal_autotoc_md2001}
\hypertarget{md_doc_decisions_ingroup_removal_autotoc_md2002}{}\doxysection{Considered Alternatives}\label{md_doc_decisions_ingroup_removal_autotoc_md2002}
\hypertarget{md_doc_decisions_ingroup_removal_autotoc_md2003}{}\doxysection{Decision}\label{md_doc_decisions_ingroup_removal_autotoc_md2003}
The {\ttfamily ingroup} message will be removed as it does not yield any notable benefit.\hypertarget{md_doc_decisions_ingroup_removal_autotoc_md2004}{}\doxysection{Rationale}\label{md_doc_decisions_ingroup_removal_autotoc_md2004}
\hypertarget{md_doc_decisions_ingroup_removal_autotoc_md2005}{}\doxysection{Implications}\label{md_doc_decisions_ingroup_removal_autotoc_md2005}
The {\ttfamily ingroup} will be removed from all implementations, metakeys and tests.\hypertarget{md_doc_decisions_ingroup_removal_autotoc_md2006}{}\doxysection{Related Decisions}\label{md_doc_decisions_ingroup_removal_autotoc_md2006}
See \mbox{\hyperlink{md_doc_decisions_error_codes}{Error concept}}\hypertarget{md_doc_decisions_ingroup_removal_autotoc_md2007}{}\doxysection{Notes}\label{md_doc_decisions_ingroup_removal_autotoc_md2007}
