\hypertarget{md_doc_decisions_warning_array_autotoc_md2201}{}\doxysection{Problem}\label{md_doc_decisions_warning_array_autotoc_md2201}
Currently multiple warnings are saved in an elektra non-\/conforming array notation which is limited to 100 entries. The notation of {\ttfamily \#00} is against the design \mbox{\hyperlink{md_doc_decisions_array}{decision made}}.\hypertarget{md_doc_decisions_warning_array_autotoc_md2202}{}\doxysection{Constraints}\label{md_doc_decisions_warning_array_autotoc_md2202}
\hypertarget{md_doc_decisions_warning_array_autotoc_md2203}{}\doxysection{Assumptions}\label{md_doc_decisions_warning_array_autotoc_md2203}
\hypertarget{md_doc_decisions_warning_array_autotoc_md2204}{}\doxysection{Considered Alternatives}\label{md_doc_decisions_warning_array_autotoc_md2204}
\hypertarget{md_doc_decisions_warning_array_autotoc_md2205}{}\doxysection{Decision}\label{md_doc_decisions_warning_array_autotoc_md2205}
The format should be aligned with the correct array notation, starting with {\ttfamily \#0}. The maximum number of warnings will stay at 100 entries ({\ttfamily \#0} -\/ {\ttfamily \#\+\_\+99}).\hypertarget{md_doc_decisions_warning_array_autotoc_md2206}{}\doxysection{Rationale}\label{md_doc_decisions_warning_array_autotoc_md2206}
\hypertarget{md_doc_decisions_warning_array_autotoc_md2207}{}\doxysection{Implications}\label{md_doc_decisions_warning_array_autotoc_md2207}
To keep the ordering we add an underscore {\ttfamily \+\_\+} once we go to beyond 10 warnings ({\ttfamily \#\+\_\+10}).\hypertarget{md_doc_decisions_warning_array_autotoc_md2208}{}\doxysection{Related Decisions}\label{md_doc_decisions_warning_array_autotoc_md2208}

\begin{DoxyItemize}
\item \mbox{\hyperlink{md_doc_decisions_array}{Array}}
\end{DoxyItemize}\hypertarget{md_doc_decisions_warning_array_autotoc_md2209}{}\doxysection{Notes}\label{md_doc_decisions_warning_array_autotoc_md2209}
